OTI111 Capture Help - Contents

Introduction

Use the mouse to click at the area you'd like to learn more about!


Introduction

The OAK Technology Video Capture Utility is a Windows Application which demonstrates the video display and capture ability of the Spitfire OTI-64111

This manual is a reference guide to OAKCAPV, providing information about each function in the program.


Capture Format

Display a dialog box used to select the capture video format.


Video Source Control

Display a dialog box used to control the video input source and standard. The available sources are TV,AV, and S-Video. The standards are NTSC,PAL and SECAM. Choose automatic as standard to auto detect the input video standard.


Display Control

Display a dialog box used to control the video output. This dialog contains controls that affect the hue, contrast, brightness, saturation, vertical and horizontal filters.


Next Channel

To next channel


Previous Channel

To previous channel


Compress AVI File

Compress  an avi file


Capture Configuration

Configure the capture parameters


Capture Video

Capture video to the avi file.


Capture Multiple Frames

Capture multiple frames  to the avi file.


Capture Bitmap

Capture video  to the bitmap file.


TV Channel


Mute State

Click here to toggle mute state

Mute On

Mute Off


Tuner Setup

Tuner setup dialog. Let you adjust tuner functions such as media type, finetuning


Volume Setup


Video source and standard

Click here to change the video source and standard


Exit


Media Type

Click here to change the media type

Antenna

Cable


Play AVI Files


Toggle Video Window between topmost and normal


Expand or Shrink Control Panel


About Spitfre Capture Utility


Status and Error Message


Help


Video Window

Video Window, Click right mouse button to bring up control window and left button to activate video window.